diff --git a/src/views/Control/ServerLed/ServerLed.vue b/src/views/Control/ServerLed/ServerLed.vue
index e5c6dac..72726ba 100644
--- a/src/views/Control/ServerLed/ServerLed.vue
+++ b/src/views/Control/ServerLed/ServerLed.vue
@@ -64,9 +64,7 @@
           indicatorLedActiveState
         )
         .then((message) => this.successToast(message))
-        .catch(({ message }) => {
-          this.errorToast(message);
-        });
+        .catch(({ message }) => this.errorToast(message));
     },
   },
 };
