diff --git a/src/components/Global/LoadingBar.vue b/src/components/Global/LoadingBar.vue
index 1034de6..0e9551b 100644
--- a/src/components/Global/LoadingBar.vue
+++ b/src/components/Global/LoadingBar.vue
@@ -80,7 +80,9 @@
   opacity: 1;
   transition: opacity $duration--moderate-01 $standard-easing--productive;
   height: 0.4rem;
-  &.fade-enter,
+
+  &.fade-enter, // Remove this vue2 based only class when switching to vue3
+  &.fade-enter-from, // This is vue3 based only class modified from 'fade-enter'
   &.fade-leave-to {
     opacity: 0;
   }
