diff --git a/src/views/Operations/SerialOverLan/SerialOverLanConsole.vue b/src/views/Operations/SerialOverLan/SerialOverLanConsole.vue
index 0bda43d..ce8549d 100644
--- a/src/views/Operations/SerialOverLan/SerialOverLanConsole.vue
+++ b/src/views/Operations/SerialOverLan/SerialOverLanConsole.vue
@@ -1,6 +1,20 @@
 <template>
   <div :class="isFullWindow ? 'full-window-container' : 'terminal-container'">
     <b-row class="d-flex">
+      <b-col sm="4" md="6">
+        <alert
+          v-if="serverStatus === 'on' ? false : true"
+          variant="warning"
+          :small="true"
+          class="mt-4"
+        >
+          <p class="col-form-label">
+            {{ $t('pageSerialOverLan.alert.disconnectedAlertMessage') }}
+          </p>
+        </alert>
+      </b-col>
+    </b-row>
+    <b-row class="d-flex">
       <b-col class="d-flex flex-column justify-content-end">
         <dl class="mb-2" sm="6" md="6">
           <dt class="d-inline font-weight-bold mr-1">
@@ -24,6 +38,7 @@
 </template>
 
 <script>
+import Alert from '@/components/Global/Alert';
 import { AttachAddon } from 'xterm-addon-attach';
 import { FitAddon } from 'xterm-addon-fit';
 import { Terminal } from 'xterm';
@@ -34,6 +49,7 @@
 export default {
   name: 'SerialOverLanConsole',
   components: {
+    Alert,
     IconLaunch,
     StatusIcon,
   },
