diff --git a/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue b/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue
index 426d5c2..fe87e08 100644
--- a/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue
+++ b/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue
@@ -385,6 +385,7 @@
         .msgBoxConfirm(this.$t('pageFirmware.modal.serverShutdownMessage'), {
           title: this.$t('pageFirmware.modal.serverShutdownWillCauseOutage'),
           okTitle: this.$t('pageFirmware.modal.shutDownServer'),
+          cancelTitle: this.$t('global.action.cancel'),
           okVariant: 'danger',
         })
         .then((shutdownConfirmed) => {
