diff --git a/src/views/Configuration/Firmware/FirmwareModalRebootBackupBmc.vue b/src/views/Configuration/Firmware/FirmwareModalRebootBackupBmc.vue
index 8f9a8f8..305bb6c 100644
--- a/src/views/Configuration/Firmware/FirmwareModalRebootBackupBmc.vue
+++ b/src/views/Configuration/Firmware/FirmwareModalRebootBackupBmc.vue
@@ -2,6 +2,7 @@
   <b-modal
     id="modal-reboot-backup-bmc"
     :ok-title="$t('pageFirmware.modal.rebootFromBackup.primaryAction')"
+    :cancel-title="$t('global.action.cancel')"
     :title="$t('pageFirmware.modal.rebootFromBackup.title')"
     @ok="$emit('ok')"
   >
