diff --git a/src/views/Control/RebootBmc/RebootBmc.vue b/src/views/Control/RebootBmc/RebootBmc.vue
index 03880b3..900619c 100644
--- a/src/views/Control/RebootBmc/RebootBmc.vue
+++ b/src/views/Control/RebootBmc/RebootBmc.vue
@@ -64,6 +64,7 @@
         .msgBoxConfirm(this.$t('pageRebootBmc.modal.confirmMessage'), {
           title: this.$t('pageRebootBmc.modal.confirmTitle'),
           okTitle: this.$t('global.action.confirm'),
+          cancelTitle: this.$t('global.action.cancel'),
         })
         .then((confirmed) => {
           if (confirmed) this.rebootBmc();
