diff --git a/src/views/Health/HardwareStatus/HardwareStatusTableFans.vue b/src/views/Health/HardwareStatus/HardwareStatusTableFans.vue
index 6cf51a2..a4481e2 100644
--- a/src/views/Health/HardwareStatus/HardwareStatusTableFans.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatusTableFans.vue
@@ -44,12 +44,12 @@
 import IconChevron from '@carbon/icons-vue/es/chevron--down/20';
 
 import StatusIcon from '@/components/Global/StatusIcon';
-import TableDataFormatter from '@/components/Mixins/TableDataFormatter';
+import TableDataFormatterMixin from '@/components/Mixins/TableDataFormatterMixin';
 import TableSortMixin from '@/components/Mixins/TableSortMixin';
 
 export default {
   components: { IconChevron, PageSection, StatusIcon },
-  mixins: [TableDataFormatter, TableSortMixin],
+  mixins: [TableDataFormatterMixin, TableSortMixin],
   data() {
     return {
       fields: [
