diff --git a/src/views/AccessControl/SslCertificates/ModalUploadCertificate.vue b/src/views/AccessControl/SslCertificates/ModalUploadCertificate.vue
index 653a232..a97fa4d 100644
--- a/src/views/AccessControl/SslCertificates/ModalUploadCertificate.vue
+++ b/src/views/AccessControl/SslCertificates/ModalUploadCertificate.vue
@@ -47,7 +47,9 @@
           id="certificate-file"
           v-model="form.file"
           accept=".pem"
-          plain
+          :browse-text="$t('global.fileUpload.browseText')"
+          :drop-placeholder="$t('global.fileUpload.dropPlaceholder')"
+          :placeholder="$t('global.fileUpload.placeholder')"
           :state="getValidationState($v.form.file)"
         />
         <b-form-invalid-feedback role="alert">
