diff --git a/src/views/Control/ServerPowerOperations/ServerPowerOperations.vue b/src/views/Control/ServerPowerOperations/ServerPowerOperations.vue
index 01fc661..441217f 100644
--- a/src/views/Control/ServerPowerOperations/ServerPowerOperations.vue
+++ b/src/views/Control/ServerPowerOperations/ServerPowerOperations.vue
@@ -108,11 +108,12 @@
 import PageSection from '../../../components/Global/PageSection';
 import BVToastMixin from '../../../components/Mixins/BVToastMixin';
 import BootSettings from './BootSettings';
+import LoadingBarMixin from '@/components/Mixins/LoadingBarMixin';
 
 export default {
   name: 'ServerPowerOperations',
   components: { PageTitle, PageSection, BootSettings },
-  mixins: [BVToastMixin],
+  mixins: [BVToastMixin, LoadingBarMixin],
   data() {
     return {
       form: {
@@ -132,6 +133,13 @@
       return this.$store.getters['hostBootSettings/overrideEnabled'];
     }
   },
+  created() {
+    this.startLoader();
+  },
+  beforeRouteLeave(to, from, next) {
+    this.hideLoader();
+    next();
+  },
   methods: {
     powerOn() {
       this.$store.dispatch('controls/hostPowerOn');
