diff --git a/src/views/Health/HardwareStatus/HardwareStatusTableDimmSlot.vue b/src/views/Health/HardwareStatus/HardwareStatusTableDimmSlot.vue
index 6ae7443..79bbe96 100644
--- a/src/views/Health/HardwareStatus/HardwareStatusTableDimmSlot.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatusTableDimmSlot.vue
@@ -9,6 +9,7 @@
       sort-icon-left
       no-sort-reset
       sort-by="health"
+      responsive="md"
       :items="dimms"
       :fields="fields"
       :sort-desc="true"
