diff --git a/src/views/Health/HardwareStatus/HardwareStatusTablePowerSupplies.vue b/src/views/Health/HardwareStatus/HardwareStatusTablePowerSupplies.vue
index 98ec52d..b6dd326 100644
--- a/src/views/Health/HardwareStatus/HardwareStatusTablePowerSupplies.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatusTablePowerSupplies.vue
@@ -8,6 +8,7 @@
     <b-table
       sort-icon-left
       no-sort-reset
+      responsive="md"
       sort-by="health"
       :items="powerSupplies"
       :fields="fields"
