diff --git a/src/components/AppHeader/AppHeader.vue b/src/components/AppHeader/AppHeader.vue
index aadb8e7..8f00476 100644
--- a/src/components/AppHeader/AppHeader.vue
+++ b/src/components/AppHeader/AppHeader.vue
@@ -98,8 +98,8 @@
 import IconClose from '@carbon/icons-vue/es/close/20';
 import IconMenu from '@carbon/icons-vue/es/menu/20';
 import IconRenew from '@carbon/icons-vue/es/renew/20';
-import StatusIcon from '../Global/StatusIcon';
-import LoadingBar from '../Global/LoadingBar';
+import StatusIcon from '@/components/Global/StatusIcon';
+import LoadingBar from '@/components/Global/LoadingBar';
 
 export default {
   name: 'AppHeader',
