diff --git a/src/env/components/FirmwareSingleImage/FirmwareSingleImageModalSwitchToRunning.vue b/src/env/components/FirmwareSingleImage/FirmwareSingleImageModalSwitchToRunning.vue
new file mode 100644
index 0000000..56f505d
--- /dev/null
+++ b/src/env/components/FirmwareSingleImage/FirmwareSingleImageModalSwitchToRunning.vue
@@ -0,0 +1,31 @@
+<template>
+  <b-modal
+    id="modal-switch-to-running"
+    :ok-title="$t('pageFirmware.singleFileUpload.modal.switchImages')"
+    :cancel-title="$t('global.action.cancel')"
+    :title="$t('pageFirmware.singleFileUpload.modal.switchRunningImage')"
+    @ok="$emit('ok')"
+  >
+    <p>
+      {{ $t('pageFirmware.singleFileUpload.modal.switchRunningImageInfo') }}
+    </p>
+    <p class="m-0">
+      {{
+        $t('pageFirmware.singleFileUpload.modal.switchRunningImageInfo2', {
+          backup,
+        })
+      }}
+    </p>
+  </b-modal>
+</template>
+
+<script>
+export default {
+  props: {
+    backup: {
+      type: String,
+      required: true,
+    },
+  },
+};
+</script>
