diff --git a/src/views/Health/HardwareStatus/HardwareStatusTableDimmSlot.vue b/src/views/Health/HardwareStatus/HardwareStatusTableDimmSlot.vue
index ce80530..70df346 100644
--- a/src/views/Health/HardwareStatus/HardwareStatusTableDimmSlot.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatusTableDimmSlot.vue
@@ -1,6 +1,6 @@
 <template>
   <page-section :section-title="$t('pageHardwareStatus.dimmSlot')">
-    <b-row>
+    <b-row class="align-items-end">
       <b-col sm="6" md="5" xl="4">
         <search
           @change-search="onChangeSearchInput"
