diff --git a/src/views/ResourceManagement/Power.vue b/src/views/ResourceManagement/Power.vue
index cc0cc99..8a9503f 100644
--- a/src/views/ResourceManagement/Power.vue
+++ b/src/views/ResourceManagement/Power.vue
@@ -87,8 +87,10 @@
 import PageTitle from '@/components/Global/PageTitle';
 import LoadingBarMixin, { loading } from '@/components/Mixins/LoadingBarMixin';
 import VuelidateMixin from '@/components/Mixins/VuelidateMixin.js';
+import { useVuelidate } from '@vuelidate/core';
+
 import BVToastMixin from '@/components/Mixins/BVToastMixin';
-import { requiredIf, between } from 'vuelidate/lib/validators';
+import { requiredIf, between } from '@vuelidate/validators';
 import { mapGetters } from 'vuex';
 
 export default {
@@ -99,6 +101,11 @@
     this.hideLoader();
     next();
   },
+  setup() {
+    return {
+      v$: useVuelidate(),
+    };
+  },
   data() {
     return {
       loading,
