diff --git a/src/views/Operations/SerialOverLan/SerialOverLanConsole.vue b/src/views/Operations/SerialOverLan/SerialOverLanConsole.vue
index fc80739..ca81385 100644
--- a/src/views/Operations/SerialOverLan/SerialOverLanConsole.vue
+++ b/src/views/Operations/SerialOverLan/SerialOverLanConsole.vue
@@ -135,7 +135,7 @@
             'websocket console/default closed. code: ' +
               event.code +
               ' reason: ' +
-              event.reason
+              event.reason,
           );
         };
       } catch (error) {
@@ -153,7 +153,7 @@
       window.open(
         '#/console/serial-over-lan-console',
         '_blank',
-        'directories=no,titlebar=no,toolbar=no,location=no,status=no,menubar=no,scrollbars=no,resizable=yes,width=600,height=550'
+        'directories=no,titlebar=no,toolbar=no,location=no,status=no,menubar=no,scrollbars=no,resizable=yes,width=600,height=550',
       );
     },
   },
