diff --git a/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue b/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue
index 928d716..68f5de5 100644
--- a/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue
@@ -3,7 +3,11 @@
     <b-table :items="systems" :fields="fields">
       <!-- Expand chevron icon -->
       <template v-slot:cell(expandRow)="row">
-        <b-button variant="link" @click="row.toggleDetails">
+        <b-button
+          variant="link"
+          data-test-id="hardwareStatus-button-expandSystem"
+          @click="row.toggleDetails"
+        >
           <icon-chevron />
         </b-button>
       </template>
