diff --git a/src/components/Global/PageContainer.vue b/src/components/Global/PageContainer.vue
new file mode 100644
index 0000000..8efbf7b
--- /dev/null
+++ b/src/components/Global/PageContainer.vue
@@ -0,0 +1,23 @@
+<template>
+  <main id="main-content">
+    <slot />
+  </main>
+</template>
+
+<script>
+export default {
+  name: 'PageContainer'
+};
+</script>
+
+<style lang="scss" scoped>
+main {
+  padding-top: $spacer * 1.5;
+  padding-bottom: $spacer * 3;
+  padding-left: $spacer * 2;
+  padding-right: $spacer;
+  background-color: $gray-100;
+  height: 100%;
+  min-height: calc(100vh - 60px /*header height*/);
+}
+</style>
