diff --git a/src/views/Overview/Overview.vue b/src/views/Overview/Overview.vue
index 46944cc..ac48481 100644
--- a/src/views/Overview/Overview.vue
+++ b/src/views/Overview/Overview.vue
@@ -106,7 +106,7 @@
   mixins: [LoadingBarMixin],
   computed: mapState({
     server: state => state.system.systems[0],
-    bmcFirmwareVersion: state => state.firmware.bmcFirmwareVersion,
+    bmcFirmwareVersion: state => state.firmware.activeFirmware.version,
     powerCapValue: state => state.powerControl.powerCapValue,
     powerConsumptionValue: state => state.powerControl.powerConsumptionValue,
     serverManufacturer() {
@@ -139,7 +139,7 @@
     });
     Promise.all([
       this.$store.dispatch('system/getSystem'),
-      this.$store.dispatch('firmware/getBmcFirmware'),
+      this.$store.dispatch('firmware/getSystemFirwareVersion'),
       this.$store.dispatch('powerControl/getPowerControl'),
       quicklinksPromise,
       networkPromise,
