diff --git a/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue b/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue
index f719631..3ad717e 100644
--- a/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue
+++ b/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue
@@ -1,6 +1,6 @@
 <template>
   <b-container fluid="xl">
-    <page-title :description="$t('pageFirmware.pageDescription')" />
+    <page-title :description="$t('pageFirmware.pageDescriptionSingleImage')" />
     <!-- Operation in progress alert -->
     <alert v-if="isOperationInProgress" variant="info" class="mb-5">
       <p>
@@ -183,7 +183,7 @@
               <p class="font-weight-bold mb-1">
                 {{ $t('pageFirmware.alert.updateProcess') }}
               </p>
-              <p>{{ $t('pageFirmware.alert.updateProcessInfo') }}</p>
+              <p>{{ $t('pageFirmware.alert.updateProcessInfoSingleImage') }}</p>
             </alert>
             <b-form-group>
               <b-btn type="submit" variant="primary" :disabled="isPageDisabled">
@@ -271,7 +271,7 @@
     this.$store.dispatch('firmwareSingleImage/getUpdateServiceApplyTime');
     Promise.all([
       this.$store.dispatch('global/getHostStatus'),
-      this.$store.dispatch('firmwareSingleImage/getSystemFirwareVersion')
+      this.$store.dispatch('firmwareSingleImage/getFirmwareInformation')
     ]).finally(() => this.endLoader());
   },
   beforeRouteLeave(to, from, next) {
