diff --git a/src/env/components/FirmwareSingleImage/FirmwareSingleImageModalUpload.vue b/src/env/components/FirmwareSingleImage/FirmwareSingleImageModalUpload.vue
index d092bec..5b6dfa2 100644
--- a/src/env/components/FirmwareSingleImage/FirmwareSingleImageModalUpload.vue
+++ b/src/env/components/FirmwareSingleImage/FirmwareSingleImageModalUpload.vue
@@ -1,18 +1,20 @@
 <template>
   <b-modal
     id="modal-upload"
-    :title="$t('pageFirmware.modal.uploadAndReboot.title')"
-    :ok-title="$t('pageFirmware.modal.uploadAndReboot.primaryAction')"
+    :title="$t('pageFirmware.modal.uploadAndRebootSingleImage.title')"
+    :ok-title="
+      $t('pageFirmware.modal.uploadAndRebootSingleImage.primaryAction')
+    "
     @ok="$emit('ok')"
   >
     <p>
-      {{ $t('pageFirmware.modal.uploadAndReboot.message1') }}
+      {{ $t('pageFirmware.modal.uploadAndRebootSingleImage.message1') }}
     </p>
     <p>
-      {{ $t('pageFirmware.modal.uploadAndReboot.message2') }}
+      {{ $t('pageFirmware.modal.uploadAndRebootSingleImage.message2') }}
     </p>
     <p class="font-weight-bold">
-      {{ $t('pageFirmware.modal.uploadAndReboot.message3') }}
+      {{ $t('pageFirmware.modal.uploadAndRebootSingleImage.message3') }}
     </p>
   </b-modal>
 </template>
