diff --git a/src/views/Configuration/Firmware/FirmwareModalRebootBackupBmc.vue b/src/views/Configuration/Firmware/FirmwareModalRebootBackupBmc.vue
new file mode 100644
index 0000000..06ab65d
--- /dev/null
+++ b/src/views/Configuration/Firmware/FirmwareModalRebootBackupBmc.vue
@@ -0,0 +1,33 @@
+<template>
+  <b-modal
+    id="modal-reboot-backup-bmc"
+    :ok-title="$t('pageFirmware.modal.rebootFromBackup.primaryAction')"
+    :title="$t('pageFirmware.modal.rebootFromBackup.title')"
+    @ok="$emit('ok')"
+  >
+    <p>
+      {{ $t('pageFirmware.modal.rebootFromBackup.message1', { backup }) }}
+    </p>
+    <p>
+      {{ $t('pageFirmware.modal.rebootFromBackup.message2', { current }) }}
+    </p>
+    <p class="font-weight-bold">
+      {{ $t('pageFirmware.modal.rebootFromBackup.message3', { backup }) }}
+    </p>
+  </b-modal>
+</template>
+
+<script>
+export default {
+  props: {
+    current: {
+      type: String,
+      required: true
+    },
+    backup: {
+      type: String,
+      required: true
+    }
+  }
+};
+</script>
