diff --git a/src/views/Operations/Firmware/FirmwareAlertServerPower.vue b/src/views/Operations/Firmware/FirmwareAlertServerPower.vue
index 2a3bcba..24aa1d6 100644
--- a/src/views/Operations/Firmware/FirmwareAlertServerPower.vue
+++ b/src/views/Operations/Firmware/FirmwareAlertServerPower.vue
@@ -21,7 +21,7 @@
           </li>
         </ul>
         <template #action>
-          <b-link to="/control/server-power-operations">
+          <b-link to="/operations/server-power-operations">
             {{ $t('pageFirmware.alert.viewServerPowerOperations') }}
           </b-link>
         </template>
