diff --git a/src/views/Control/SerialOverLan/SerialOverLanConsole.vue b/src/views/Control/SerialOverLan/SerialOverLanConsole.vue
index 738065b..6c16c55 100644
--- a/src/views/Control/SerialOverLan/SerialOverLanConsole.vue
+++ b/src/views/Control/SerialOverLan/SerialOverLanConsole.vue
@@ -137,43 +137,12 @@
 <style lang="scss" scoped>
 @import '~xterm/css/xterm.css';
 
-.terminal-container {
-  #terminal {
-    overflow: auto;
-  }
-}
-@include media-breakpoint-up(xs) {
-  .terminal-container {
-    width: 100%;
-  }
-}
-@include media-breakpoint-up(sm) {
-  .terminal-container {
-    width: 80%;
-  }
-}
-@include media-breakpoint-up(md) {
-  .terminal-container {
-    width: 65%;
-  }
-}
-@include media-breakpoint-up(lg) {
-  .terminal-container {
-    width: 80%;
-  }
-}
-@include media-breakpoint-up(xl) {
-  .terminal-container {
-    width: 60%;
-  }
+#terminal {
+  overflow: auto;
 }
 
 .full-window-container {
   width: 97%;
-  max-width: 960px;
   margin: 1.5%;
-  #terminal {
-    overflow: auto;
-  }
 }
 </style>
