diff --git a/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue b/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue
index 9cb1c6a..a89dacf 100644
--- a/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue
@@ -84,7 +84,9 @@
 
 import StatusIcon from '@/components/Global/StatusIcon';
 
-import TableRowExpandMixin from '@/components/Mixins/TableRowExpandMixin';
+import TableRowExpandMixin, {
+  expandRowLabel,
+} from '@/components/Mixins/TableRowExpandMixin';
 import TableDataFormatterMixin from '@/components/Mixins/TableDataFormatterMixin';
 
 export default {
@@ -120,6 +122,7 @@
           formatter: this.tableFormatter,
         },
       ],
+      expandRowLabel: expandRowLabel,
     };
   },
   computed: {
