diff --git a/src/views/Operations/Firmware/FirmwareAlertServerPower.vue b/src/views/Operations/Firmware/FirmwareAlertServerPower.vue
index 24aa1d6..08e4ae9 100644
--- a/src/views/Operations/Firmware/FirmwareAlertServerPower.vue
+++ b/src/views/Operations/Firmware/FirmwareAlertServerPower.vue
@@ -39,6 +39,7 @@
     isServerOff: {
       required: true,
       type: Boolean,
+      default: true,
     },
   },
   computed: {
