diff --git a/src/views/Operations/Firmware/FirmwareCardsBmc.vue b/src/views/Operations/Firmware/FirmwareCardsBmc.vue
index d79a876..8fb31aa 100644
--- a/src/views/Operations/Firmware/FirmwareCardsBmc.vue
+++ b/src/views/Operations/Firmware/FirmwareCardsBmc.vue
@@ -39,7 +39,7 @@
             variant="link"
             size="sm"
             class="py-0 px-1 mt-2"
-            :disabled="isPageDisabled || !backup"
+            :disabled="isPageDisabled || !backup || !isServerOff"
           >
             <icon-switch class="d-none d-sm-inline-block" />
             {{ $t('pageFirmware.cardActionSwitchToRunning') }}
@@ -68,6 +68,11 @@
       type: Boolean,
       default: false,
     },
+    isServerOff: {
+      required: true,
+      type: Boolean,
+      default: false,
+    },
   },
   data() {
     return {
