diff --git a/src/views/Health/EventLogs/EventLogs.vue b/src/views/Health/EventLogs/EventLogs.vue
index 0c079ba..c620c2b 100644
--- a/src/views/Health/EventLogs/EventLogs.vue
+++ b/src/views/Health/EventLogs/EventLogs.vue
@@ -70,14 +70,18 @@
               data-test-id="eventLogs-checkbox-selectAll"
               :indeterminate="tableHeaderCheckboxIndeterminate"
               @change="onChangeHeaderCheckbox($refs.table)"
-            />
+            >
+              <span class="sr-only">{{ $t('global.table.selectAll') }}</span>
+            </b-form-checkbox>
           </template>
           <template #cell(checkbox)="row">
             <b-form-checkbox
               v-model="row.rowSelected"
               :data-test-id="`eventLogs-checkbox-selectRow-${row.index}`"
               @change="toggleSelectRow($refs.table, row.index)"
-            />
+            >
+              <span class="sr-only">{{ $t('global.table.selectItem') }}</span>
+            </b-form-checkbox>
           </template>
 
           <!-- Severity column -->
