diff --git a/src/views/Operations/RebootBmc/RebootBmc.vue b/src/views/Operations/RebootBmc/RebootBmc.vue
index d8c529c..e98b7da 100644
--- a/src/views/Operations/RebootBmc/RebootBmc.vue
+++ b/src/views/Operations/RebootBmc/RebootBmc.vue
@@ -40,6 +40,7 @@
 import LoadingBarMixin from '@/components/Mixins/LoadingBarMixin';
 import { useI18n } from 'vue-i18n';
 import i18n from '@/i18n';
+import { useModal } from 'bootstrap-vue-next';
 
 export default {
   name: 'RebootBmc',
@@ -49,6 +50,10 @@
     this.hideLoader();
     next();
   },
+  setup() {
+    const bvModal = useModal();
+    return { bvModal };
+  },
   data() {
     return {
       $t: useI18n().t,
@@ -67,16 +72,14 @@
   },
   methods: {
     onClick() {
-      this.$bvModal
-        .msgBoxConfirm(i18n.global.t('pageRebootBmc.modal.confirmMessage'), {
-          title: i18n.global.t('pageRebootBmc.modal.confirmTitle'),
-          okTitle: i18n.global.t('global.action.confirm'),
-          cancelTitle: i18n.global.t('global.action.cancel'),
-          autoFocusButton: 'ok',
-        })
-        .then((confirmed) => {
-          if (confirmed) this.rebootBmc();
-        });
+      this.$confirm(i18n.global.t('pageRebootBmc.modal.confirmMessage'), {
+        title: i18n.global.t('pageRebootBmc.modal.confirmTitle'),
+        okTitle: i18n.global.t('global.action.confirm'),
+        cancelTitle: i18n.global.t('global.action.cancel'),
+        autoFocusButton: 'ok',
+      }).then((confirmed) => {
+        if (confirmed) this.rebootBmc();
+      });
     },
     rebootBmc() {
       this.$store
