diff --git a/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue b/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue
index 8dca96e..95a36d3 100644
--- a/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue
+++ b/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue
@@ -9,7 +9,9 @@
           <b-row>
             <b-col>
               <dl>
-                <dt>{{ $t('pageServerPowerOperations.serverStatus') }}</dt>
+                <dt>
+                  {{ $t('pageServerPowerOperations.serverStatus') }}
+                </dt>
                 <dd
                   v-if="serverStatus === 'on'"
                   data-test-id="powerServerOps-text-hostStatus"
@@ -180,6 +182,7 @@
 import i18n from '@/i18n';
 import { privilegesId } from '@/store/modules/GlobalStore';
 import { mapGetters } from 'vuex';
+import { useModal } from 'bootstrap-vue-next';
 
 export default {
   name: 'ServerPowerOperations',
@@ -189,6 +192,10 @@
     this.hideLoader();
     next();
   },
+  setup() {
+    const bvModal = useModal();
+    return { bvModal };
+  },
   data() {
     return {
       $t: useI18n().t,
@@ -223,10 +230,9 @@
   },
   created() {
     this.startLoader();
+    const eventBus = require('@/eventBus').default;
     const bootSettingsPromise = new Promise((resolve) => {
-      this.$root.$on('server-power-operations-boot-settings-complete', () =>
-        resolve(),
-      );
+      eventBus.$once('server-power-operations-boot-settings-complete', resolve);
     });
     Promise.all([
       this.$store.dispatch('serverBootSettings/getBootSettings'),
@@ -252,17 +258,13 @@
       };
 
       if (this.form.rebootOption === 'orderly') {
-        this.$bvModal
-          .msgBoxConfirm(modalMessage, modalOptions)
-          .then((confirmed) => {
-            if (confirmed) this.$store.dispatch('controls/serverSoftReboot');
-          });
+        this.confirmDialog(modalMessage, modalOptions).then((confirmed) => {
+          if (confirmed) this.$store.dispatch('controls/serverSoftReboot');
+        });
       } else if (this.form.rebootOption === 'immediate') {
-        this.$bvModal
-          .msgBoxConfirm(modalMessage, modalOptions)
-          .then((confirmed) => {
-            if (confirmed) this.$store.dispatch('controls/serverHardReboot');
-          });
+        this.confirmDialog(modalMessage, modalOptions).then((confirmed) => {
+          if (confirmed) this.$store.dispatch('controls/serverHardReboot');
+        });
       }
     },
     shutdownServer() {
@@ -279,20 +281,19 @@
       };
 
       if (this.form.shutdownOption === 'orderly') {
-        this.$bvModal
-          .msgBoxConfirm(modalMessage, modalOptions)
-          .then((confirmed) => {
-            if (confirmed) this.$store.dispatch('controls/serverSoftPowerOff');
-          });
+        this.confirmDialog(modalMessage, modalOptions).then((confirmed) => {
+          if (confirmed) this.$store.dispatch('controls/serverSoftPowerOff');
+        });
       }
       if (this.form.shutdownOption === 'immediate') {
-        this.$bvModal
-          .msgBoxConfirm(modalMessage, modalOptions)
-          .then((confirmed) => {
-            if (confirmed) this.$store.dispatch('controls/serverHardPowerOff');
-          });
+        this.confirmDialog(modalMessage, modalOptions).then((confirmed) => {
+          if (confirmed) this.$store.dispatch('controls/serverHardPowerOff');
+        });
       }
     },
+    confirmDialog(message, options = {}) {
+      return this.$confirm({ message, ...options });
+    },
   },
 };
 </script>
