diff --git a/src/views/Control/ManagePowerUsage/ManagePowerUsage.vue b/src/views/Control/ManagePowerUsage/ManagePowerUsage.vue
index 5fcf938..38dbf0b 100644
--- a/src/views/Control/ManagePowerUsage/ManagePowerUsage.vue
+++ b/src/views/Control/ManagePowerUsage/ManagePowerUsage.vue
@@ -87,7 +87,7 @@
 
 <script>
 import PageTitle from '@/components/Global/PageTitle';
-import LoadingBarMixin from '@/components/Mixins/LoadingBarMixin';
+import LoadingBarMixin, { loading } from '@/components/Mixins/LoadingBarMixin';
 import VuelidateMixin from '@/components/Mixins/VuelidateMixin.js';
 import BVToastMixin from '@/components/Mixins/BVToastMixin';
 import { requiredIf, between } from 'vuelidate/lib/validators';
@@ -101,6 +101,11 @@
     this.hideLoader();
     next();
   },
+  data() {
+    return {
+      loading,
+    };
+  },
   computed: {
     ...mapGetters({
       powerConsumptionValue: 'powerControl/powerConsumptionValue',
