diff --git a/src/views/Logs/Dumps/DumpsModalConfirmation.vue b/src/views/Logs/Dumps/DumpsModalConfirmation.vue
index 2a1e552..4b68681 100644
--- a/src/views/Logs/Dumps/DumpsModalConfirmation.vue
+++ b/src/views/Logs/Dumps/DumpsModalConfirmation.vue
@@ -17,11 +17,11 @@
       <status-icon status="danger" />
       {{ $t('pageDumps.modal.initiateSystemDumpMessage3') }}
     </p>
-    <b-form-checkbox v-model="confirmed" @input="$v.confirmed.$touch()">
+    <b-form-checkbox v-model="confirmed" @input="v$.confirmed.$touch()">
       {{ $t('pageDumps.modal.initiateSystemDumpMessage4') }}
     </b-form-checkbox>
     <b-form-invalid-feedback
-      :state="getValidationState($v.confirmed)"
+      :state="getValidationState(v$.confirmed)"
       role="alert"
     >
       {{ $t('global.form.required') }}
@@ -67,14 +67,14 @@
       });
     },
     handleSubmit() {
-      this.$v.$touch();
-      if (this.$v.$invalid) return;
+      this.v$.$touch();
+      if (this.v$.$invalid) return;
       this.$emit('ok');
       this.closeModal();
     },
     resetForm() {
       this.confirmed = false;
-      this.$v.$reset();
+      this.v$.$reset();
     },
   },
 };
