diff --git a/src/views/Operations/Firmware/Firmware.vue b/src/views/Operations/Firmware/Firmware.vue
index 44a721a..db1a4c7 100644
--- a/src/views/Operations/Firmware/Firmware.vue
+++ b/src/views/Operations/Firmware/Firmware.vue
@@ -46,6 +46,7 @@
 import PageTitle from '@/components/Global/PageTitle';
 
 import LoadingBarMixin, { loading } from '@/components/Mixins/LoadingBarMixin';
+import { useI18n } from 'vue-i18n';
 
 export default {
   name: 'FirmwareSingleImage',
@@ -64,6 +65,7 @@
   },
   data() {
     return {
+      $t: useI18n().t,
       loading,
       isServerPowerOffRequired:
         process.env.VUE_APP_SERVER_OFF_REQUIRED === 'true',
