diff --git a/src/components/Global/LoadingBar.vue b/src/components/Global/LoadingBar.vue
index d972b86..ee33340 100644
--- a/src/components/Global/LoadingBar.vue
+++ b/src/components/Global/LoadingBar.vue
@@ -1,10 +1,11 @@
 <template>
   <transition name="fade">
-    <b-progress
-      v-if="!isLoadingComplete"
-      :value="loadingIndicatorValue"
-      height="0.4rem"
-    />
+    <b-progress v-if="!isLoadingComplete" height="0.4rem">
+      <b-progress-bar
+        :value="loadingIndicatorValue"
+        :aria-label="$t('global.ariaLabel.progressBar')"
+      />
+    </b-progress>
   </transition>
 </template>
 
