diff --git a/src/views/Control/ServerPowerOperations/ServerPowerOperations.vue b/src/views/Control/ServerPowerOperations/ServerPowerOperations.vue
index de377e1..41d8cf0 100644
--- a/src/views/Control/ServerPowerOperations/ServerPowerOperations.vue
+++ b/src/views/Control/ServerPowerOperations/ServerPowerOperations.vue
@@ -48,7 +48,7 @@
               {{ $t('pageServerPowerOperations.powerOn') }}
             </b-button>
           </template>
-          <template v-else-if="hostStatus === 'on'">
+          <template v-else>
             <!-- Reboot server options -->
             <b-form novalidate class="mb-5" @submit.prevent="rebootServer">
               <b-form-group
@@ -110,9 +110,6 @@
               </b-button>
             </b-form>
           </template>
-          <template v-else>
-            {{ $t('global.status.notAvailable') }}
-          </template>
         </page-section>
       </b-col>
     </b-row>
