diff --git a/src/views/Health/HardwareStatus/HardwareStatusTableBmcManager.vue b/src/views/Health/HardwareStatus/HardwareStatusTableBmcManager.vue
index 91aeac7..1c8bb97 100644
--- a/src/views/Health/HardwareStatus/HardwareStatusTableBmcManager.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatusTableBmcManager.vue
@@ -2,6 +2,7 @@
   <page-section :section-title="$t('pageHardwareStatus.bmcManager')">
     <b-table
       responsive="md"
+      hover
       :items="items"
       :fields="fields"
       show-empty
