diff --git a/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue b/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue
index 724f1c8..89ae511 100644
--- a/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatusTableStystem.vue
@@ -2,6 +2,7 @@
   <page-section :section-title="$t('pageHardwareStatus.system')">
     <b-table
       responsive="md"
+      hover
       show-empty
       :items="systems"
       :fields="fields"
